-2.4 -2 -1.6 -1.2 -0.8 -0.4 0 0.4 0.8 1.2 1.6 2 2.4 time (hrs)

-100

-75

-50

-25

0

25

50

75

100 v (km/s)

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 0

1215.3

1215.4

1215.5

1215.6

1215.7

1215.8

1215.9

1216