HD209458b

-10 -5 0 5 10 x (R_p) -10 -5 0 5 10 y (R_p)

2e-20

4.1e-19

8.5e-18

1.8e-16

3.6e-15

7.5e-14

(g/cm^3)

-10 -5 0 5 10 x (R_p) -10 -5 0 5 10 y (R_p)

1e-06

1.6e-05

0.00025

0.004

0.063 1

Neutral Fraction

-10 -5 0 5 10 x (R_p) -10 -5 0 5 10 y (R_p)

1.5e+03

3.3e+03

7.2e+03

1.6e+04

3.4e+04

7.5e+04

T (K)

-10 -5 0 5 10 x (R_p) -10 -5 0 5 10 z (R_p)

2e-20

4.1e-19

8.5e-18

1.8e-16

3.6e-15

7.5e-14

(g/cm^3)

-10 -5 0 5 10 x (R_p) -10 -5 0 5 10 z (R_p)

1e-06

1.6e-05

0.00025

0.004

0.063 1

Neutral Fraction

-10 -5 0 5 10 x (R_p) -10 -5 0 5 10 z (R_p)

1.5e+03

3.3e+03

7.2e+03

1.6e+04

3.4e+04

7.5e+04

T (K)