X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 X=0.028 [ 0.16 < Q2 < 5.73 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 X=0.076 [ 0.16 < Q2 < 11.28 ]

X=0.076 [ 0.16 < Q2 < 11.28 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 X=0.149 [ 0.16 < Q2 < 43.54 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 X=0.248 [ 0.44 < Q2 < 43.54 ]

X=0.248 [ 0.44 < Q2 < 43.54 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 X=0.347 [ 0.44 < Q2 < 43.54 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 X=0.447 [ 0.79 < Q2 < 43.54 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 X=0.545 [ 1.47 < Q2 < 43.54 ]

X=0.545 [ 1.47 < Q2 < 43.54 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 X=0.649 [ 1.47 < Q2 < 43.54 ]

WA59 F2 experiment data fit

A=0.542 B=0.306 Cv1d=0.212 Cv1u=0.285 Cv2d=0.266 Cv2u=0.185

Cs1d=0.618 Cs1u=0.363 Cs2d=0.000 Cs2u=0.000 nSLACp=1.000 nSLACd=0.990 nBCDMSp=0.966 nBCDMSd=0.986 nNMCp=1.002

Data GRV98 LO No Nuclear corr