X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 X=0.015 [ 1.26 < Q2 < 7.94 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 X=0.045 [ 1.26 < Q2 < 31.62 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 X=0.080 [ 1.26 < Q2 < 50.12 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 X=0.125 [ 2.00 < Q2 < 79.43 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 X=0.175 [ 2.00 < Q2 < 79.43 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 X=0.225 [ 3.16 < Q2 < 125.90 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 X=0.275 [ 3.16 < Q2 < 125.90 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 X=0.350 [ 5.01 < Q2 < 199.50 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 X=0.450 [ 5.01 < Q2 < 199.50 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 X=0.650 [ 7.94 < Q2 < 199.50 ]