X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 X=0.030 [ 1.50 < Q2 < 11.00 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 X=0.080 [ 1.50 < Q2 < 24.00 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 X=0.125 [ 1.50 < Q2 < 24.00 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 1.4 X=0.175 [ 1.50 < Q2 < 24.00 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 1.2 X=0.250 [ 1.50 < Q2 < 55.00 ]

X 1 10^210

F2

0 0.2 0.4 0.6 0.8 1 X=0.350 [ 1.50 < Q2 < 55.00 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 X=0.450 [ 1.50 < Q2 < 55.00 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 X=0.550 [ 1.50 < Q2 < 55.00 ]

X 1 10^210

F2

0 0.1 0.2 0.3 0.4 0.5 X=0.700 [ 1.50 < Q2 < 55.00 ]

WA25 F2 experiment data fit

A=0.542 B=0.306 Cv1d=0.212 Cv1u=0.285 Cv2d=0.266 Cv2u=0.185

Cs1d=0.618 Cs1u=0.363 Cs2d=0.000 Cs2u=0.000 nSLACp=1.000 nSLACd=0.990 nBCDMSp=0.966 nBCDMSd=0.986 nNMCp=1.002

Data GRV98 LO No Nuclear corr