0 500 1000

1500

2000

2500

-8 -6 -4 -2 0 0 200 400 600 800 1000

1200

-8 -6 -4 -2 0

0

100

200

300

400

500

-8 -6 -4 -2 0 q^2 (GeV/c)^2 dσ/dq^2 (arb. units)

E_ν = 5 GeV All W < 2 GeV

q^2 (GeV/c)^2 dσ/dq^2 (arb. units)

E_ν = 5 GeV W < 1.4 GeV

q^2 (GeV/c)^2 dσ/dq^2 (arb. units)

E_ν = 5 GeV 1.4 < W < 1.6 GeV

q^2 (GeV/c)^2 dσ/dq^2 (arb. units)

E_ν = 5 GeV 1.6 < W < 2.0 GeV

0 100 200 300 400 500 600 700 800

-8 -6 -4 -2 0