GGM79 GGM81 BEBC79

IHEP79 IHEP95

E_ν (GeV) σ_{CC}/E_ν (10^{-38} cm^2/GeV)

Quasi-elastic

Resonant

Resonant DIS

0

0.1

0.2

0.3

0.4

0.5

1 10