)^2

(GeV 2Q 0 0.5 1 1.5 2 2.5 3

Nuclear Correction

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1 =25 MeV

BIND , E 12 Nucl. Corr., Fermi Gas, C

neutrino antineutrino