]^2

Mass [GeV/c

+π^-D

4.6 4.8 5.0 5.2 5.4 5.6

2 Entries per 10 MeV/c

0 50 100 150 200 250

2

0

-1 CDF Run II Preliminary, L = 119 pb 43 ± )=1135 0 N(B