]^2

Mass [GeV/c

+π^-_sD

5.0 5.5

2 Entries per 20 MeV/c

0 10 20 30 40 50

2

0

-1 CDF Run II Preliminary, L = 119 pb 11 ± ) = 84 0 s N(B