]^2

K) [GeV/c * M(K 1.85 1.9 1.95 2

Number of Entries / 4.0 MeV

0

500

1000 ) = 1200 ± s N(D

CDF RunII Preliminary^{-1} 185 pb≈L

X^-_s D^+ l→ _sB